2.5 3 3.5 4 4.5

Pressure (MPa)

Measured Phase boundary

03:00:00 06:00:00 09:00:00 12:00:00 Elapsed time (hh:mm:ss)

276.5 277 277.5 278 278.5

Temperature (K)