t0

Vapor peak intensity

0 20 40 60 80 100 t2 t5

LC CH4 intensity

0

200

400

600

800

SC CH4 intensity

0

100

200

300

Cage occupancy _S

0.5

0.6

0.7

0.8

0.9

Hydration number nc

5.8 6 6.2 6.4 6.6 6.8