t0

Optical image t1 t2

Hydration number nc

5.8 6 6.2 6.4 6.6 6.8

Cage occupancy _L

0.96

0.97

0.98

0.99

1

Cage occupancy _S

0.5

0.6

0.7

0.8

0.9