12:00:00 24:00:00 36:00:00 48:00:00 2 3 4

P (MPa)

00:00:00 12:00:00 24:00:00 36:00:00 48:00:00 276 277 278 279

Sample T (K)

00:00:00 12:00:00 24:00:00 36:00:00 48:00:00 Elapsed time (hh:mm:ss) 296 297 298 299

Room T (K)